\makeatletter
\newdimen\errorsize \errorsize=0.2pt
% Frame with a label at top
\newcommand\LabFrame[2]{%
    \fboxrule=\FrameRule
    \fboxsep=-\errorsize
    \textcolor{FrameColor}{%
    \fbox{%
      \vbox{\nobreak
      \advance\FrameSep\errorsize
      \begingroup
        \advance\baselineskip\FrameSep
        \hrule height \baselineskip
        \nobreak
        \vskip-\baselineskip
      \endgroup
      \vskip 0.5\FrameSep
      \hbox{\hskip\FrameSep \strut
        \textcolor{TitleColor}{\textbf{#1}}}%
      \nobreak \nointerlineskip
      \vskip 1.3\FrameSep
      \hbox{\hskip\FrameSep
        {\normalcolor#2}%
        \hskip\FrameSep}%
      \vskip\FrameSep
    }}%
}}
\definecolor{FrameColor}{rgb}{0.25,0.25,1.0}
\definecolor{TitleColor}{rgb}{1.0,1.0,1.0}

\newenvironment{contlabelframe}[2][\Frame@Lab\ (cont.)]{% 
  % Optional continuation label defaults to the first label plus
  \def\Frame@Lab{#2}%
  \def\FrameCommand{\LabFrame{#2}}%
  \def\FirstFrameCommand{\LabFrame{#2}}%
  \def\MidFrameCommand{\LabFrame{#1}}%
  \def\LastFrameCommand{\LabFrame{#1}}%
  \MakeFramed{\advance\hsize-\width \FrameRestore} 
}{\endMakeFramed} 
\newcounter{definition}
\newenvironment{definition}[1]{%
  \par
  \refstepcounter{definition}%
  \begin{contlabelframe}{Definition \thedefinition:\quad #1}
 \noindent\ignorespaces}
{\end{contlabelframe}} 
\makeatother
